<template>
  <h2 class="tool-title">JSON Minifier</h2>
  <hr class="mt-5 mb-5">

  <div class="input-group">
    <label for="data">Data</label>
    <textarea id="data" v-model="toolData.data" v-on:keyup="minify"></textarea>
  </div>

  <hr class="mt-5 mb-5">

  <div class="input-group">
    <label for="result">Result</label>
    <MonacoEditor name="result" language="json" :value="toolResult"></MonacoEditor>
  </div>
</template>

<script>
import MonacoEditor from "@/components/MonacoEditor.vue";

export default {
  components: {
    MonacoEditor
  },
  data() {
    return {
      toolData: {
        data: '',
      },
      toolResult: '',
    };
  },
  methods: {
    minify() {
      if (!this.toolData.data.length) {
        this.toolResult = '';
      } else {
        try {
          this.toolResult = JSON.stringify(JSON.parse(this.toolData.data));
        } catch (e) {
          this.toolResult = 'invalid syntax';
        }
      }
    }
  },
}
</script>

<style lang="scss">

</style>